-60.0 -40.0 -20.0 0.0 20.0 40.0 60.0 Scan Angle (deg.)

10^6

10^7

10^8

10^9

Signal (arb.)

Specular Reflection 09/11/95, 21:05 UT

Altitude 5600 m

3.03o